MEDOC

Development and evaluation of open fulltext-based information services for informatics

In Brief:

German Digital Library project Involves 10 universities, 4 technical colleges and 3 research institutions, including Springer-Verlag.

Will contain text books, conference proceedings, electronic journals and technical reports.

Started in September 1995, will run for two years. For use by German institutions only in the first instance

Three participating groups:

Core group

select and procure material to be offered select and develop required tools Pilot users

Define and set up local infrastructure Independantly evaluate tools and materials provided by core group Publishers, professional societies and libraries

Contribute material

Systems

ARIADNE (not the same as Ariadne in the UK

It’s difficult to evaluate the other systems themselves; it’s as if they’re speaking another language :-) However, they do have a great technical report index at Bonn, even if we do say so ourselves.

Craig Nevill-Manning, July 1996 Last modified: Thu Aug 1 14:09:34 NZST 1996