   The  AUX  program  allows  VT100 auxillary key definitions and command
   line editing ala VAX/VMS V4.x systems. The program also saves the last
   twenty  commands  which can then be recalled.  In this release of AUX,
   the  auxillary  keys are statically defined.  A "DEFINE KEY" interface
   may be added for the next version of AUX if it becomes widely used.

   The main AUX documentation is contained in file AUXKEY.PAD.  This file
   is  used  by  AUX to display help from the program when the PF2 (help)
   key  or  the  PF1  (GOLD)  PF2 key is pressed.  This help file must be
   placed in LB:[1,2] for system wide access.

   To start AUX, simply type "AUX" if it is installed, or "RUN $AUX".  The
   program is not currently setup as a Command Line Interface (CLI).  AUX
   will  accept input and spawn the command line to your default CLI when
   you press the return key.  To exit AUX, type CTRL/Z.

   The following is the control key definitions:

   Control Keys:

	CTRL/A		Toggle between overprint and insert mode.
	CTRL/B		Skip backward to next character input.
	CTRL/C		Delete the entire command line.
	CTRL/D		Delete to end of command line.
	CTRL/E		Position to end of command line.
	CTRL/F		Skip forward to next character input.
	CTRL/H (BS)	Position to beginning of command line.
	CTRL/J (LF)	Delete the previous word.
	CTRL/M (CR)	Terminate the current command line.
	CTRL/R		Recall all previous command lines.
	CTRL/T		Display one line status report.
	CTRL/U		Delete to beginning of command line.
	CTRL/V		Display the current version number.
	CTRL/W		Refresh the current command line.
	CTRL/Z		Exit from the AUX program.
	DELETE		Delete the previous character.

	!n		Recall command line number 'n'.
