 
 The following SRD switch defaults apply on this system:
 
  /NA - sort by file name first, then by file type
 /-LI - do not list the selected file names
  /RD - use revision date in date selection and in /MI/M2 listing
 /-SR - do not sort the file names before listing
  /SY - include system UFD's (group 1-10) in [*,*] and [*,n] searches
 /-00 - do not include [0,0] in [*,*] searches
  /AT - attach output device if a terminal
 /-WI - no implicit wildcarding
 /-WD - no implicit wildcarding during delete operations
  /M2 - use type 2 middle directory listing when /MI specified
  /HD - display command line in the heading
  /SM - include summary lines following the file listing
 /-BK - do not precede each file name with two blank characters
