1 ORCAM
ORCAM is a utility which converts PDP-11 object code to MACRO-11.

The command line takes the form:

     >ORCAM [outspec[/switches]=]inspec[/switches]

The usual RSX-11M conventions for file specifications apply.  If the  filetype
is not supplied in a file specification, it is assumed to be:

     .OBJ for the input file
     .MAC for the output file

An indirect command file may be specified, but indirect command files may  not
be nested.

If no outspec or '=' appears in the command line, the output  appears  at  the
user's terminal (TI:).

2 Switches

Two switches are allowed, allowing the user to alter the I/D  attributes  of
up to 8 .PSECTs each in the input file:

     /IN:name:name:... -- Sets named PSECTs to I type
     /DA:name:name:... -- Sets named PSECTs to D type
