TROFF ARLPUB,FILE

Performs a RUNOFF operation on FILE using the macros defined in ARLPUB.RNO.
These macros are chosen to conform to the layout defined by General Document
013 by J.Y. Mann. The one exception is the increase in line density from 6 to
6.25 per inch to allow for line drawings. The default layout is thus:
12 PITCH, 75 ACTIVE CHARACTERS/LINE; 69 ACTIVE LINES/PAGE; SINGLE SPACING
HYPENATION IS OFF BY DEFAULT; PUT .HY IN FILE TO ENABLE.

Macros defined by Peter McFadden:-
1. Needing NO parameters:
	Greek:		PI    CHI   ALPHA BETA  DELTA SIGMA 
	Math:		INFIN APPRO ARROW 
2. Single Parameters:
	BIG A{#####A}
	Equations:
		LHS	Left Hand Side of Equation
		RHS	Right Hand Side of Equation
		EQN	EQuation Number
	Section Headers: (suggest HD etc. for new use)
		SH	Chapter Number and Name

Macros defined by Graham Forsyth:-
1. Needing NO parameters:
	FNSET		SETup FootNote
	INTRO		Finish front page and start Introduction
	SUMMRY		Start Summary on Title Page

2. Single Parameters:
	AUTHOR		Name of AUTHOR for Title Page
	REF		REFerence number
	HD		Chapter HeaDer (numbered "m" automatically)
	SHD		Chapter SubHeaDer (numbered "m.n" automatically)
	SSHD		Chapter SubSubHeaDer
	TITLE		Each Line of TITLE for Title Page

3. Two parameters:
	AUTHR2		Name of AUTHORs for Title Page
	TITPAG		Start title page with AR number and AP Memo number

4. Three parameters:
	AUTHR3		Name of AUTHORs for Title Page

