	CTTY n/SWITCHES

---     CTTY - Change System Console
---     This is a severely hacked version of the unsupported DEC utility
        CONSOL by C G Wilson, Charleville, Australia.
---	Internal table supports 8 different hardware addresses and vectors
---	Original version clashed with STAR hardware and crashed under SHARE

SWITCHES
	/H	help
	/L	list terminals tabled in CTTY with hardware available
	/F	lists full list of terminals tabled in this programme
	/C	lists current terminal details

EXAMPLE:
	CTTY 2		Changes console to use line 2

RESTRICTIONS

	CTTY V2 will not run under SHARE or TSX but trap to an error message.
