LINK V06.01H				B. Kup, 1-Apr-82
------------
Option switches:
/ALPHABETIZE	-	/A	Alphabetical list of globals
/BOTTOM:n	-	/B:n	Bottom address changed to n (Ill with /R)
/PROMPT		-	/C	Continue line
/EXTEND:n	-	/E:n	Extend a program section to size n (not addr)
 *		-	/F	Use the default FORTRAN library SY:FORLIB
 *		-	/G	Size library EPT buffer for mult. def. lib.
/TOP:n		-	/H:n	Highest addr
/INCLUDE	-	/I	Include global symbols from library
 *		-	/K:n	Inserts value (n=1-28) into loc 56 of blk 0
/LDA		-	/L	LDA format (Ill with /R)
/STACK[:n]	-	/M[:n]	Manual (console) specification of stack addr
 *		-	/O:n	Overlay in low memory, overlay region n
 *		-	/P:n	extend libr. routine list space
 *		-	/Q	Query start addr of up to 8 root sections
/FOREGROUND[:n]	-	/R[:n]	REL format (n=stack size)
/SLOWLY		-	/S	Space for linker symbol table set to maximum
/TRANSFER[:n]	-	/T[:n]	Transfer addr (Start addr) specification 
/ROUND:n	-	/U:n	rounds Up a program section (n=power of 2)
/XM		-	/V:n[:m]Virtual overlay in extended memory, region n
/WIDE		-	/W	Wide load map listing
/NOBITMAP	-	/X	Xclude bitmap for code below 400
/BOUNDARY:value -	/Y:n	start a program section on addr boundary n
/FILL:n		-	/Z:n	set unused locations in load module to n
		-	//	allows additional lines of command string
