To use hhexec mo.sys must be loaded and ndial.num must be be on sy: device
Maybe ndial.num must be on dk:  I don't remember..

Must use a DLV11-e  At 175610 and 350

if at wrong address

set mo: csr=17xxxxx
set mo:vector=xxx

